0 30 60 90 120 150 0 3 6 9 12 15

0 30 60 90 120 150 0 3 6 9 12 15

0 30 60 90 120 150 0 3 6 9 12 15 UF

q_e (mg NH_4^+ /g)

C_0(mg NH_4^+ /dm^3)

UFo (T=24 ^oC) UFr (T=19 ^oC)

SF

q_e(mg NH_4^+/g)

C_0 (mg NH_4^+/dm^3)

SFo (T=24 ^oC) SFr (T=19 ^oC)

GF

q_e (mg NH_4^+ /g)

C_0 (mg NH_4^+/dm^3)

GFo (T=24 ^oC) GFr (T=19 ^oC)